0 0.5 1 0

0.005

0.01

0.015

0 0.5 1 0

0.005

0.01

0.015

0 0.5 1 0

0.005

0.01

0.015

0 0.5 1 0

0.005

0.01

0.015

0 0.5 1 0

0.005

0.01

0.015

|ηΔ Minimum | and global fit ΔnV

[GeV/c]:

assoc Tp 0.25-0.5 0.5-0.75 0.75-1 1-1.5 1.5-2 2-2.5 2.5-3

〉)ϕΔ cos(n 〈 global

(a)] n (t)v n[v n = 1 n = 2 n = 3 n = 4 n = 5

2.76 TeV Pb-Pb 0-10% central < 4 GeV/c

trig T 3 < p